TimedExposureBlocks

TimedExposureMode

DEAIF

FEPIF

2DWindowLists

TimedExposureClockBuilder

TimedExposureFEPLoad

EventProcessor

TimedExposureBlock start run (block id) fetch block (block id) get Window List Id fetch Window List (window list id)

2DWindowList install load

SystemConfiguration install (CCD list) setup

DEAIF TimedExposureBlock apply CCD settings generate and load load SRAM load PRAM apply settings

get subarray info

FEPIF

TimedExposureBlock

apply (subarray info) apply FEP options load settings

configure

EventProcessor

DEAIF

FEPIF Time-Stamp start start clocking sample get start time process events (start time)

Fetch

General Setup

Parameter blocks

Hardwar e Setup

Softwar e Setup

Start Data Acquisition and Processing

CommandIF