CCDs

CCD Clocks/Biases

S0 S1 S2 S3 S4 S5

I2 I3

I0 I1

Imaging (ACIS-I)

Spectroscopy (ACIS-S)

Back End Processor digital pixel data

Digital Pr ocessing Assembly

commands

events

Detector Electr onics Assembly

status status commands

FEP 0 FEP 1 FEP 2 FEP 3 FEP 4 FEP 5 analog pixel data

Interface Board

CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller CCD Controller

bus