1-35 Add Bad Continuous Clocking Column page 104 1-36 Reset Bad Continuous Clocking Column Map page 104 1-37 Dump Bad Continuous Clocking Columns page 103 1-38 Add Bad Timed Exposure Column page 104 1-39 Reset Bad Timed Exposure Column Map page 104 1-40 Dump Bad Timed Exposure Columns page 103 1-41 1-42 Uplink Boot Commands page 129 1-43 Start Load from Uplink page 129 1-44 Continue Load from Uplink page 129 1-45 1-46 Patch Commands page 125 1-47 Add Patch page 126 1-48 Remove Patch page 126 1-49 Dump Patch List page 127

TABLE 1. List of Softwar e Commands(Continued)

Req Command T ype Command

Reference Page

TABLE 1. List of Softwar e Commands

Req Command T ype Command

Reference Page 1-1 Parameter Block Commands page 40 1-2 Load Timed Exposure Parameter Block page 53 1-3 Load Continuous Clocking Parameter Block page 81 1-4 Load DEA Housekeeping Parameter Block page 122 1-5 Load 2-D Window List page 57 1-6 Load 1-D Window List page 84 1-7 1-8 Science Control Commands page 40 1-9 Stop Science Run page 44 1-10 Start Timed Exposure Run page 48 1-11 Compute Timed Exposure Bias page 48 1-12 Start Continuous Clocking Run page 80 1-13 Compute Continuous Clocking Bias page 80 1-14 1-15 DEA Housekeeping Control

Commands page 122

1-16 Start DEA Housekeeping Run page 123 1-17 Stop DEA Housekeeping Run page 123 1-18 1-19 Memory Commands page 106 1-20 Read BEP Memory page 107 1-21 Write BEP Memory page 108 1-22 Execute BEP Memory page 109 1-23 Read FEP Memory page 110 1-24 Write FEP Memory page 108 1-25 Execute FEP Memory page 109 1-26 Read SRAM page 109 1-27 Write SRAM page 108 1-28 Read PRAM page 109 1-29 Write PRAM page 108 1-30 System Configuration Commands page 99

1-31 Change System Configuration Setting page 101 1-32 Add Bad Pixel page 102 1-33 Reset Bad Pixel List page 102 1-34 Dump Bad Pixels page 103