TABLE 1. Stop DEA Housekeeping Run Command Req Field Name Description 1-1 Packet Word Length This indicates the total number of 16-bit words in the command packet 1-2 Packet Identifier This identifies the command packet in a series. 1-3 Command Opcode “Stop DEA Housekeeping Run” command opcode. This instructs the ACIS software to stop the current run.