TABLE 1. Start DEA Housekeeping Run Command

Req Field Name Description 1-1 Packet Word Length This indicates the total number of 16-bit words in the command packet 1-2 Packet Identifier This identifies the command packet in a series. 1-3 Command Opcode “Start DEA Housekeeping Run” command opcode. This instructs the ACIS software to retrieve the parameter block indicated by “Slot Id” below, and run the requested DEA Housekeeping operation. ACIS will continue to run the operation until commanded to stop.

1-4 Slot Id This identifies the DEA Housekeeping Parameter block to use for the run. This block may have been loaded just prior to the Start Run command, or may be part of either the pre-loaded library, or one of the blocks provided at launch.