TABLE 1. RTX Task and Interrupt Service Calls Function Description Expect to Use NU_Change_Priority() Change the task priority No NU_Change_Time_Slice() Change the task’s time-slice No NU_Control_Interrupts() Enable/Disable Interrupts Yes NU_Current_Task_Id() Return Id of current task Yes NU_Disable_Preemption() Disable Context Switching Yes NU_Enable_Preemption() Enable Context Switching Yes NU_Relinquish() Allow other tasks of same priority to run Yes NU_Reset() Reset task to initial state No NU_Retrieve_Task_Status() Retrieve status for a specified task Yes NU_Sleep() Relinquish control for a period of time Yes NU_Start() Start a suspended task Yes NU_Stop() Suspend a running task No