TABLE 1. ‘Interrupt Contr oller’ Operations Function Inputs Outputs Initialize none none Disable none Disables all interrupts and returns previous interrupt state Enable none Enable interrupts Handle Interrupt Interrupt Cause Mask Calls each interrupt handler associated with all pending interrupts in the “mask”