RWA Reaction Wheel Assembly SAAD South Atlantic Anomaly Detector SEDB Systems Engineering Data Base SEMP Systems Engineering Management Plan SI Science Instrument SIAH Science Instrument Accommodation Housing SIM Science Instrument Module SOW Statement of Work SPL Sound Pressure Level SRM&QA Safety, Reliability, Maintenance & Quality Assurance SSE Space Support Equipment STE Special Test Equipment STS Space Transportation System TBD To Be Determined TBR To Be Revised TBS To Be Supplied TCS Thermal Control System TDRSS Tracking and Data Relay Satellite System TEC Thermoelectric Cooler TGS Transmission Grating Spectrometer TS Telescope System vdc volts direct current WBS Work Breakdown Structure WIP Work In Progress XRCF X-Ray Calibration Facility XRS X-ray Spectrometer

MP Master Plan MSB Most Significant Bit MSFC Marshall Space Flight Center MSOCC Multi-Satellite Operations Control Center mV millivolt NA Not Applicable/Available NASA National Aeronautics and Space Administration NSTS National Space Transportation System OBA Optical Bench Assembly OBC On-Board computer OCC Payload Operations Control Center OD Operations Directive OGM Objective Grating Mechanism ORU Orbital Replaceable Unit OTG Objective Transmission Grating PCAD Pointing Control and Aspect Determination PCM Program Change Manager PDIS Power, Digital & Integrating Structure PDR Preliminary Design Review PMP Parts Materials & Processes PRD Program Requirements Document PRR Preliminary Requirements Review PS Power Supply PSF Point Spread Function PTS Power and Thermal-Control Structure QA Quality Assurance RAM Random Access Memory RCTU Remote Command and Telemetry Unit RFC Request for Change RFI Radio Frequency Interference RID Review Item Discrepancy ROM Read Only Memory

HEG High Energy Grating HETG High Energy Transmission Grating HMSS HRMA Module Support Structure HRC High Resolution Camera HRMA High Resolution Mirror Assembly Hz Hertz I/F Interface IC Integrated Circuit ICD Interface Control Document ICS/E Item Change Schedule/Estimate ID Identification IEP Instrument Engineering Plan IPI Instrument Principal Investigator IRD Interface Requirements Document IS Integrating Structure JSC Johnson Space Center JU Job Unit kbps kilobits per second keV kilo electron Volt km kilometer KSC Kennedy Space Center LETG Low Energy Transmission Grating LOS Line of Sight LSB Least Significant Bit μ micro (10-6) MA milliamp MEL Master Equipment List MGSE Mechnical Ground Support Equipment min minimum MIT Massachusetts Institute of Technology MLI Multi-Layer Insulation MMAG Martin Marietta Astronautics Group

DDT&E Design, Develop, Test & Evaluate DEA Detector Electronics Assembly DH Detector Housing DPA Digital Processing Assembly DPS Detector and Processor Subsystem DR Data Requirements ECM Engineering Change Manager ECP Engineering Change Proposal EEE Electrical, Electronic and Electromagnetic EGSE Electrical Ground Support Equipment EMC Electromagnetic Compatibility EMI Electromagnetic Interference EPD Engineering Procedures Directive EPS Electrical Power Subsystem ETR Eastern Test Range EU Engineering Unit eV Electron Volt EVA Extravehicular Activity FLCA Fiducial Light Controller Assembly FMEA Failure Mode Effects Analysis FOV Field of View FPA Focal Plane Array FPSI Focal Plane Science Instrument FRACAS Failure Reporting and Corrective Action System FU Flight Unit FWHM Full Width Half Maximum g Gravity GESS Grating Element Support Structure GFE Government Furnished Equipment GSE Ground Support Equipment GSFC Goddard Space Flight Center HEAO High Energy Astronomical Observatory

ABBREVIATIONS

ACIS AXAf-I CCD Imaging Spectrometer AFD Aft Flight Deck ATP Authority to Proceed AXAF Advanced X-ray Astrophysics Facility AXAF-I Advanced X-ray Astrophysics Facility-Imaging Mission BER Bit Error Rate BOD Bright Object Detector BOE Basis of Estimate C&DM Configuration and Data Management CCCB Contractor Configuration Control Board CCD Charge Coupled Device CDM Command and Data Management CDR Critical Design Review CDS CCD Detector Subsystem CEI Contract End Item CEIS Contract End Item Specification CFE Contractor Furnished Equipment CI Configuration Item/Inspection cm Centimeter CMS Command Management System COD Change Order Directive CPA Change Proposal Authorization CPU Central Processing Unit CSR Center for Space Research CTD Charge Transfer Device DA Detector Assembly DASS Detector Assembly Support Structure db decibel dc direct current