ACIS SOW SOWAXAF- I

Project

Requirements

Document

PRDACIS

Contract End

Item

Specification

MSFC X-Ray

Science

Instruments

Calibration

CALREQCEIAXAF - I to

SI Interface

Control

ICDMGSE-to-EGSE

Interface Control

ICDetector and

Processor

Subsystem

Equipment

Specification(s)

ESPECVRSDVerification Requirements and Specifications

SWDPSPTSPower and Thermal-

Control Structure

Software

Detector and

Processor Subsystem

ICDPS-to-PTS

ICDFocal Plane-to-Detector

Housing Interface

Control Document

Mechanical GSE

ESPECElectrical GSE

ESPECACIS GSE Power and

Thermal-Control

ESPECACIS Flight

Instrument

Figure 3.1.3-2 ACIS Specification Tree